51760 51762 51764 51766 51768 51770 51772 51774 51776 51778

1.84

1.86

1.88

1.9

1.92

1.94

1.96

1.98

2

2.02

74 day temperature time-series from 5 current meters

Time [modified Julian day]

T [oC]