800 810 820 830 840 850 860 870

1966

1967

1968

Pressure, db

70 hours of oscillating P and magnitude from S mooring meter 250mab

800 810 820 830 840 850 860 870

1940

1941

1942

Depth, m

Latitude=47.9

800 810 820 830 840 850 860 870 0

0.05

0.1

Magnitude, m/s

Elapsed time, hr