34.56 34.58 34.6 34.62

1.65

1.7

1.75

1.8

1.85

1.9

1.95

2

Salinity, psu θ,oC

27.625

27.6388

27.6388

27.6527

27.6527

27.6665

27.6665

27.6803

27.62 27.64 27.66 27.68 27.7

-2300

-2200

-2100

-2000

-1900

-1800

-1700

σ_θ, kg/m^3+1000

Depth, m

Mean S valley SE flank W flank Far N