34.56 34.57 34.58 34.59 34.6 34.61 34.62 34.63 34.64

1.65

1.7

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1 2.15

Mean background and MEF N/S wallsΘ-S

Salinity, psu

Θ,oC

Mean NorthWall=Stn10 SouthWall=Stn12 SouthWall=Stn13