34.55 34.56 34.57 34.58 34.59 34.6 34.61 34.62

1.65

1.7

1.75

1.8

1.85

1.9

1.95

2 Flow Mow Mean background and Mixing Zephyr backgroundsΘ-S

Salinity, psu

Θ,oC

Mean ~20km W ~5km SE ~40km ENE