129˚ 30' 129˚ 15' 129˚ 00' 128˚ 45'

47˚ 30'

47˚ 45'

48˚ 00'

48˚ 15'

48˚ 30'

East Heck Seamount

West Valley

Endeavour Seamount

Endeavour Segment

Cobb Segment

Failed Propagator

Cobb Offset

FZ2

FZ1 -2900

-2800

-2700

-2600

-2500

-2400

-2300

-2200

-2100

-2000

-1900

-1800

-1700

-1600

-1500

-1400Depthinmeters

129˚ 126˚ 123˚ 120˚

45˚

48˚

JdFR

Endeavour Segment