2000

4000

6000

8000

10000

12000

14000

16000

Northing (m)

2000 4000 6000 8000 10000 Easting (m)

HT

HT

HT

HT ht ht

ht

mwt0 mwtn

mwtne3

mwts mwtsw3 vhc0 vhce0 vhcnw1 vhcnw2 vhcnw3

vhcse3

vhcse4 vhcse4a vhcsw1

vhcsw2

vhcsw3

vhcsw4

vhcsw5 ofl10 ofl11 ofl12

ofle1 ofle14

ofle21 ofle4 ofle6 ofle7

oflnw

VH

VH

VH

VH VH

OTZ AVF

OTZ

AVF

AWFZ OTZ

AVF OTZ AWFZ OTZ

OTZ

47.900

47.925

47.950

47.975

48.000

48.025

Latitude (deg N)

-129.150 -129.125 -129.100 -129.075 -129.050

Longitiude (deg W)

A

B