0 0.5 1 1.5 2 2.5 3 3.5

-0.5 0 0.5 σ2 2-1 [kg/m3]

0 0.5 1 1.5 2 2.5 3 3.5 -5 0 5

Δθ 2 [oC]

0 0.5 1 1.5 2 2.5 3 3.5

-2220

-2200

-2180

-2160

-2140

-2120

Depth [m]

0 1 2 3 4 5 6 7 8

-0.1 0 0.1

0 1 2 3 4 5 6 7 8 -1 0 1

0 1 2 3 4 5 6 7 8

-2150

-2100

-2050

Elapsed time [hr]