-0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4 0

50

100

McD factor forΔ_zθ

Height (m)

McD factors over a range of S_o for differentΔθ

-0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4 0

50

100

McD factor forΔ_Sθ

0 5 10 15 20 25 30 35 40 45 50 55

-0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4 0

50

100

McD factor forΔ_ρ θ