0 1000 2000 3000 4000 5000 0

50

100

150

Plume area (m^2)

Height (m)

T=350^oC, S=45psu

-150 -100 -50 0 50 100 150

0 50 100 150

Plume radius (m)

-500 -400 -300 -200 -100 0 0

50

100

150

Plume Δρ (kg/m^3)

0 10 20 30 40 0

50

100

150

Transport (m^3/s)