0 0.2 0.4 0.6 0.8 1 0

50

100

150

Δθ (^oC)

Height (m)

T=350^oC, S=45psu

z ref S ref ρ ref

-0.04 -0.02 0 0.02 0.04 0

50

100

150

Δ S (psu)

-15 -10 -5 0 5 10 0

50

100

150

Flux

B, m^4/s^3 M, m^4/s^2

-0.5 0 0.5 1 1.5 0

50

100

150

McD correction factor

Δθ_z Δθ_S Δθ_ρ