0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 x 10^5

2050

2100

2150

2200

2250 depth, m

ABE50 depth,Δθ, and Y position time series

0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 x 10^5

-0.5

0

0.5

1

Δθ,oC

0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 x 10^5

5500

6000

6500

7000

Elapsed t, s