5.8 5.9 6 6.1 6.2 6.3 6.4 6.5 6.6

-2200

-2190

-2180

Depth [m]

Stn 10 horizontal tow section

5.8 5.9 6 6.1 6.2 6.3 6.4 6.5 6.6 0 0.2 0.4 0.6 0.8

Δθ2 [oC]

5.8 5.9 6 6.1 6.2 6.3 6.4 6.5 6.6

0.05 0.1 0.15 0.2 0.25

Backscatter

Elapsed time [hr]