0 2000 4000 6000 8000 10000 12000 0

2

4

6 bks

CTD10 Backscatter time series

4770 4780 4790 4800 4810 4820 4830 4840 4850 4860 4870 0

2

4

7000 7020 7040 7060 7080 7100 7120 7140 0 0.5 1