51763.20 51763.22 51763.24 51763.26 51763.28 51763.30

0.00

0.05

0.10

Stn 11 Δθ_2 between plumes

MJD

Δθ2

0.050

0.054

0.051 0.055

0.057

N end of MEF

SSE end N central MEF