51764.81 51764.82 51764.83 51764.84 51764.85 51764.86

-0.10

-0.05

0.00

0.05

0.10

0.15

MJD

Δθ2

Stn 15 Δθ_2 between plumes

N central MEF S end

Central MEF

S&M 0.061

0.033

0.071

0.073

0.079

-0.011