492500 492550 492600 492650 492700 492750 492800 492850 492900 492950

5310500

5310550

5310600

5310650

5310700

5310750

5310800

5310850

5310900

FM CTD Stn30 (30-60mab)Δθ_2 distribution

UTM X, m

UTM Y, m cyan>0.07^oC red>0.11^oC yellow>0.4^oC