51773.30 51773.32 51773.34 51773.36 51773.38 51773.40 51773.42

0.00

0.05

0.10

MJD

Δθ2

Stn 31 Δθ_2 between plumes

0.054 0.031

0.067

0.040

0.076

NE Lobo

Central NMEF

E Hulk

NW Hulk

N end