1.65 1.7 1.75 1.8 1.85 1.9 1.95 2

-2300

-2250

-2200

-2150

-2100

-2050

-2000

-1950

-1900

-1850

-1800

-1750

Potential Temperature depth, [m] bkground 1

Deep S

SoMEF

NoMEF

Deep N