~500m north of MEF

0.024

1825m

0.076

1850m

0.150

1875m

0.242

1900m

0.264

1925m

0.283

1950m

0.287

1975m

0.294

2000m

0.320

2025m

0.282

2050m

0.213

2075m

0.157

2100m

0.112

2125m

0.092

2150m

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0.071

2175m

Backscatter, CTD3,5,14,28