0 0.2 0.4 0.6 0.8 1 1.2 1.4 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

x data points y data points

Least squares fit, HW#1, coeffs: 0.998 -1.018 0.225