0 20 40 60 80 100 120 140 160 180 200

-100 -90 -80 -70 -60 -50 -40 -30 -20 -10 0

0.012

0.025

0.05

0.1

0.2

0.4

0.8

Horizontal Temperature Gradient [oC/km]

km off axis km below axis