-50 0 50 100 150 200 250

-100

-80

-60

-40

-20

0

20

km off axis km below axis

1000oC Isotherms for 3 Spreading Rates (5,25,100mm/yr)

1e+03

--- 005mm/yr

1e+03 +++ 025mm/yr

1e+03 *** 100mm/yr