0 2 4 6 8 x 10^{-5} 2.5 3 3.5 4 4.5 5 5.5 6 6.5 7 7.5

Uspread [km/yr]

Crustal Depth [km]

"Cooling" Crustal Depth vs 5-80mm/yr Uspread for tm=1352oC