0 1 2 3 4 5 6 7 8 9 10 -10 -9 -8 -7 -6 -5 -4 -3 -2 -1 0

time [Ma] depth [km]

Simple plate model isotherms

96.7

193

290

387

483 580 677 773 870 1.06e+03

1.35e+03