32 33 34 35

-2500

-2000

-1500

-1000

-500 0

Salinity [o/oo]

Depth [m]

85 90 95

-2500

-2000

-1500

-1000

-500 0

Transmissivity [%]

0 5 10 15 20

-2500

-2000

-1500

-1000

-500 0

Temp [oC]

32 33 34 35 0

5

10

15

Temperature [oC]

Salinity [psu] -15

-10 -5 0

5 10 15

32.6 33.6 34.5

35.5

36.5

Pressure = 2000 dbars

REVEL0501 T-S-X data