34.53 34.54 34.55 34.56 34.57 34.58 34.59 34.6 34.61 34.62 34.63

-2500

-2400

-2300

-2200

-2100

-2000

-1900

-1800

-1700

-1600

-1500

REVEL0501 S profile

Salinity [o/oo]

Depth [m]