32 32.5 33 33.5 34 34.5 35 0

2

4

6

8

10

12

14

16

18 REVEL1101 S-T with q and sig-t contours

Temperature [oC]

Salinity [psu]

-15 -10

-5

0

5 10 15 32.6

33.6 34.5

35.5

36.5

Pressure = 2000 dbars