93.8 93.85 93.9 93.95 94 94.05 94.1 94.15 94.2

-2600

-2500

-2400

-2300

-2200

-2100

-2000

-1900

-1800

-1700

-1600

REVEL 1101 X profile - ZOOM

Transmissivity [%]

Depth [m]