34.5 34.52 34.54 34.56 34.58 34.6 34.62 34.64 1.6

1.7

1.8

1.9

2

2.1

2.2

Salinity [psu]

Potential Temperature [oC]

Deep Rev1101 S-Th Polyfit

theta=-53.8s^3+5603s^2-194407s+2248449