0 5 10 15 20

-3000

-2500

-2000

-1500

-1000

-500

0

PotT and T

Depth [m]

1.6 1.7 1.8

-2600

-2550

-2500

-2450

-2400

-2350

-2300

-2250

-2200

-2150

-2100

PotT and T

RVL1101 T and PotT Profiles