1.6 1.8 2 2.2

-2300

-2200

-2100

-2000

-1900

-1800

-1700

PotT and T

Depth [m]

1.65 1.7 1.75 1.8 1.85

-2300

-2280

-2260

-2240

-2220

-2200

-2180

-2160

-2140

-2120

-2100

RVL1201 T and PotT Profiles