34.5434.5634.5834.634.6234.64

1.65

1.7

1.75

1.8

1.85

1.9

1.95

2

Pot. Temp

Salinity

-0.4

-0.2

0

0.2

0.4

92 93 94

-2200

-2100

-2000

-1900

-1800

-1700

Depth m

Trans %

1.8 2

-2200

-2100

-2000

-1900

-1800

-1700

Pot_T oC

27.6 27.65

-2200

-2100

-2000

-1900

-1800

-1700

SigmaTheta

0 0.2 0.4

-2200

-2100

-2000

-1900

-1800

-1700

pfit q