51773.9 51774.0 51774.1 51774.2 51774.3 51774.4 51774.5 51774.6 51774.7 51774.8 51774.9 -20

-10

0

10

20

N/S Velocity, V [cm/s]

Comparison of V from Tivey, FM50mab, WASP, ABE50, and predicted currents, and pressure

predicted FM50 WASP meg ABE50

51773.9 51774.0 51774.1 51774.2 51774.3 51774.4 51774.5 51774.6 51774.7 51774.8 51774.9

2229

2229.5

2230

2230.5

2231

2231.5

2232

MJD

Pressure, P [dbar]