Stn10 N #1 (0.091)

Stn10 N #2 (0.063)

Stn10 N #3 (0.053)

X [m]

0 100 200 300

Stn12 S #1 (0.076)

Z [m]

-2200

-2150

-2100

Stn12 S #2 (0.068)

-2200

-2150

-2100

Stn12 S #3 (0.067)

X [m]

0 100 200 300

-2200

-2150

-2100

Stn12 S #4 (0.070)

Stn13 S #1 (0.053)

X [m]

0 100 200 300

Stn12 S #5 (0.072)

oC

0

0.05

0.1