0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09 0.1

X, km

Y, km

Day: 51766, hr: 22.5

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 -1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

0 50 100 150 200 250 300 350

-1000 0 1000

Net Flux, MW

Elapsed time, hr

Puff model: Net flux and temperature distribution

-0.1 0 0.1

-0.1

0

0.1 Current src: Harmonic+1

U, m/s

V, m/s